<template>
  <div class="fullscreen text-center q-pa-md flex flex-center">
    <div>
      <div style="font-size: 20vh">404</div>
      <div class="text-h2" style="opacity: 0.4">Oops. Nothing here...</div>
      <q-btn
        class="q-mt-xl"
        color="primary"
        to="/wp-admin/admin.php?page=livesheets#/"
        label="Go Home"
        no-caps
      />
    </div>
  </div>
</template>

<script setup lang="ts">
defineOptions({
  name: 'ErrorNotFound',
});
</script>
