import DebugViewHelp from './help/DebugViewHelp';
import MeasurementIdHelp from './help/MeasurementIdHelp';

const ConnectWithGAHelpSection = () => {
  return (
    <div>
      <MeasurementIdHelp />
      <DebugViewHelp />
    </div>
  );
};

export default ConnectWithGAHelpSection;
